;module-definition file for generic -- used by link4.exe

NAME	qexit	   ; application's module name

DESCRIPTION 'Sample Microsoft Windows Application'

STUB	'WINSTUB.EXE' ; Generates error message if application
					  ; is run without Windows

CODE	MOVEABLE	  ; code can be moved in memory

;DATA must be MULTIPLE if program can be invoked more than once

DATA	MOVEABLE MULTIPLE

HEAPSIZE  1024
STACKSIZE 4096  ; recommended minimum for Windows applications

; All functions that will be called by any Windows routine
; MUST be exported.

EXPORTS
	qexitWndProc   @1  ; name of window processing function
